Centrality

0-5% 5-10% 10-20% 20-30% 30-40% 40-50% 50-60%

|>2} ηΔ {EP, | 2v

0

0.05

0.1

2q 0-10% 2q 10-20% 2q 20-30% 2q 30-40% 2q 40-50% unbiased

2q 50-60% 2q 60-70% 2q 70-80% 2q 80-90% 2q 90-100%

= 2.76 TeV NNs Pb − ALICE Pb | < 0.8 η | c < 5.0 GeV/ Tp 0.2 <